FIFE Follow-On Dataset: Site Averaged Flux Data: 1987-89 (Betts)
Data Center: ORNL DAAC -- The DAAC for Biogeochemical Dynamics
Data Center Contact: Merilyn Gentry   email:  mjg@ornl.gov
                                      phone:  423-376-2655
Source Dataset (SAS):        ffo_flx.ssd01
ASCII Data File:             ffo_flx.dat     File Creation Date: 25OCT1996
ASCII Data Definition File:  ffo_flx.def     File Creation Date: 25OCT1996
****************************************************************************
Variable Name  Long Name               SAS Type  Description
1  Ysq_no                              8         "Time interval of the year broken down into 30-minute intervals"
2  Rnet        NET_RADTN               8         "Average net radiation (W/m2)"
3  Rnet_k                              8         "Number of sites included in average net radiation (Rnet)"
4  Rnet_s                              8         "Standard deviation of average net radiation (Rnet)"
5  LH          LATENT_HEAT_FLUX        8         "Average latent heat flux (W/m2)"
6  LH_s                                8         "Standard deviation of average latent heat flux (LH)"
7  LH_k                                8         "Number of sites included in average latent heat flux (LH)"
8  SH          SENSIBLE_HEAT_FLUX      8         "Average sensible heat flux (W/m2)"
9  SH_s                                8         "Standard deviation of average sensible heat flux (SH)"
10 SH_k                                8         "Number of sites included in average sensible heat flux (SH)"
11 Soil        SOIL_HEAT_FLUX          8         "Average soil heat flux (W/m2)"
12 Soil_s                              8         "Standard deviation of average soil heat flux (Soil)"
13 Soil_k                              8         "Number of sites included in average soil heat flux (Soil)"
14 SolDn       TOTAL_INCIDENT_RADTN    8         "Average total incident radiation (W/m2)"
15 SolDn_s                             8         "Standard deviation of average total incident radiation (SolDn)"
16 SolDn_s                             8         "Number of sites included in average total incident radiation (SolDn)"
17 SolRef      SHORTWAVE_SOLAR_REFL    8         "Average shortwave solar reflectance (W/m2)"
18 SolRef_s                            8         "Standard deviation of average shortwave solar reflectance (SolRef)"
19 SolRef_k                            8         "Number of sites included in average shortwave solar reflectance (SolRef)"
20 LWDn        LONG_WAVE_DOWN          8         "Average longwave down (W/m2)"
21 LWDn_s                              8         "Standard deviation of average longwave down (LWDn)"
22 LWDn_k                              8         "Number of sites included in average longwave down (LWDn)"
23 LWup        LONG_WAVE_UP            8         "Average longwave up (W/m2)"
24 LWup_s                              8         "Standard deviation of average longwave up (LWup)"
25 LWup_k                              8         "Number of sites included in average longwave up (LWup)"
26 Jul_Date                            8         "Julian date (day of year 1-366)"
27 UTC                                 8         "Decimal time"
28 obs_date                            8         "Observation date (mm/dd/yyyy)"
29 obs_time                            8         "Observation time (hhmm)"
30 year                                8         "Year"
