BOREAS TGB-03 CH4 Chamber Flux Data: NSA Fen

7.3 Data Characteristics

7.3.1 Parameter/Variable

The parameters contained in the data files on the CD-ROM are:

         Column Name
------------------------------
SITE_NAME
SUB_SITE
DATE_OBS
COLLAR_ID
AIR_TEMP
CH4_FLUX
CRTFCN_CODE
REVISION_DATE

7.3.2 Variable Description/Definition

The descriptions of the parameters contained in the data files on the CD-ROM 
are:

         Column Name                             Description
------------------------------ ------------------------------------------------
SITE_NAME                      The identifier assigned to the site by BOREAS, in 
                               the format SSS-TTT-CCCCC, where SSS identifies
                               the portion of the study area: NSA, SSA, REG, 
                               TRN, and TTT identifies the cover type for the 
                               site, 999 if unknown, and CCCCC is the identifier
                               for site, exactly what it means will vary with 
                               site type.
SUB_SITE                       The identifier assigned to the sub-site by 
                               BOREAS, in the format GGGGG-IIIII, where GGGGG is 
                               the group associated with the sub-site 
                               instrument, e.g. HYD06 or STAFF, and IIIII is the 
                               identifier for sub-site, often this will refer to 
                               an instrument.
DATE_OBS                       The date on which the data were collected.
COLLAR_ID                      A TGB designation for the chamber collar site.
AIR_TEMP                       The air temperature.
CH4_FLUX                       Methane flux.
CRTFCN_CODE                    The BOREAS certification level of the data.  
                               Examples are CPI (Checked by PI), CGR (Certified 
                               by Group), PRE (Preliminary), and CPI-??? (CPI 
                               but questionable).
REVISION_DATE                  The most recent date when the information in the
                                referenced data base table record was revised.

7.3.3 Unit of Measurement

The measurement units for the parameters contained in the data files on the CD-
ROM are:

         Column Name                                Units
------------------------------ ------------------------------------------------
SITE_NAME                      [none]
SUB_SITE                       [none]
DATE_OBS                       [DD-MON-YYYY]
COLLAR_ID                      [none]
AIR_TEMP                       [degrees Celsius]
CH4_FLUX                       [micromoles][meter^-2][second^-1]
CRTFCN_CODE                    [none]
REVISION_DATE                  [DD-MON-YYYY]

7.3.4 Data Source

The source of the parameter values contained in the data files on the CD-ROM 
are:

         Column Name                             Data Source
------------------------------ ------------------------------------------------
SITE_NAME                      Not Applicable
SUB_SITE                       Not Applicable
DATE_OBS                       Investigator
COLLAR_ID                      Investigator
AIR_TEMP                       [PLEASE COMPLETE]
CH4_FLUX                       GC-FID
CRTFCN_CODE                    Not Applicable
REVISION_DATE                  Not Applicable

7.3.5  Data Range

The following table gives information about the parameter values found in the 
data files on the CD-ROM.

                     Minimum        Maximum        Missng  Unrel  Below   Data
                     Data           Data           Data    Data   Detect  Not
Column Name          Value          Value          Value   Value  Limit   Cllctd
--------------------------------------------------------------------------------
SITE_NAME            NSA-FEN-FLXTR  NSA-FEN-FLXTR  None    None   None    None
SUB_SITE             TGB03-FLX01    TGB03-FLXZF    None    None   None    None
DATE_OBS             09-MAY-1994    21-OCT-1996    None    None   None    None
COLLAR_ID            CB1c01         ZFC-03         None    None   None    None
AIR_TEMP             -5             28             None    None   None    Blank
CH4_FLUX             -6.9921875     1.39266204     -999    -888   None    Blank
CRTFCN_CODE          CPI            CPI            None    None   None    None
REVISION_DATE        14-APR-1997    29-APR-1998    None    None   None    None
--------------------------------------------------------------------------------
Minimum Data Value -- The minimum value found in the column.
Maximum Data Value -- The maximum value found in the column.
Missng Data Value  -- The value that indicates missing data. This is used to
                      indicate that an attempt was made to determine the
                      parameter value, but the attempt was unsuccessful.
Unrel Data Value   -- The value that indicates unreliable data.  This is used
                      to indicate an attempt was made to determine the
                      parameter value, but the value was deemed to be
                      unreliable by the analysis personnel.
Below Detect Limit -- The value that indicates parameter values below the
                      instruments detection limits.  This is used to
                      indicate that an attempt was made to determine the
parameter value, but the analysis personnel determined
                      that the parameter value was below the detection
                      limit of the instrumentation.
Data Not Cllctd    -- This value indicates that no attempt was made to
                      determine the parameter value.  This usually
                      indicates that BORIS combined several similar but
                      not identical data sets into the same data base table
                      but this particular science team did not
                      measure that parameter.

Blank -- Indicates that blank spaces are used to denote that type of value.
N/A   -- Indicates that the value is not applicable to the respective column.
None  -- Indicates that no values of that sort were found in the column.

7.4 Sample Data Record

SITE_NAME,SUB_SITE,DATE_OBS,COLLAR_ID,AIR_TEMP,CH4_FLUX,CRTFCN_CODE,
REVISION_DATE
'NSA-FEN-FLXTR','TGB03-FLX01',09-MAY-1994,'TF4c19',,-.0810069,'CPI',17-APR-1998
'NSA-FEN-FLXTR','TGB03-FLX01',09-MAY-1994,'TF4n19',,-.0810069,'CPI',17-APR-1998
